Module (CF b.b.) ref.pl=sensor corners

500 520 540 560 580 600

0 20 40 60 80 100 120

y=0 30mm 60mm

x(mm) z(μm) up-side

-600

-580

-560

-540

-520

-500

0 20 40 60 80 100 120

y=0 30mm 60mm x(mm) z(μm) down-side

Module (CF b.b.) ref.pl=sensor corners

-40 -30 -20 -10 0 10 20 30 40

0 20 40 60 80 100 120

y=0 30mm 60mm x(mm) z-median(μm) median lines