K3103 up (facings coord)

-60 -40

-20 0

20 40 60 -20 0 20 -150

-100 -50 0 50 100 150

-120

-100 -80 -60 -40 -20 0 20 40 60

-60 -40 -20 0 20 40 60

X (mm)

Module Z (mm) hybrid

-30 mm 0 +30 mm yϑ