0

5

10

15

20

25

30

0 20 40 60 80 100 120 140 160 180 200

Bias Voltage(V)

Total Leakage(μA)

01 (T=25^oC) 03 (T=20^oC) 04 (T=20^oC) 09 (T=25^oC) 15 (T=20^oC) 16 (T=25^oC) 19 (T=25^oC) 22 (T=25^oC)

SEIKO

0 2 4 6 8 10 12 14 16 18 20

0 25 50 75 100 125 150 175 200 225

01 (T=25^oC:SEIKO)

01 (T=20^oC:Tsukuba)

04 (T=20^oC:SEIKO)

04 (T=20^oC:Tsukuba)

Bias Voltage(V)

Total Leakage(μA)

SEIKO