5 6 7 8 9 10

20

30 40 50 60 70 80 90 100

0 10 20 30 40 50 60 70 80 90 100 Bias voltage(V)

Interstrip C1(pF)

10K Hz

100K Hz

1M Hz

10M KHz

SEIKO-04