10^{-1}

1

10

10^2

0 100 200 300 400 500 Channel Number (D256-U256)

Leakage (nA) at V=100V

SEIKO 141739-19 p-side

1

10

10^2

0 25 50 75 100 125 150 175 200

Entries Mean RMS 512 14.24 15.05

Leak current (nA) at 100V

SEIKO 141739-19

Number of channels