1

10

10^2

10^3

0 50 100 150 200 250 300 350 400 Elapsed Time (min)

Leakage Current (μ A)

30 krad +130 krad

Hamamatsu (ave of 2) SEIKO 04 SEIKO 12

Vb=55V Vb=45V

Vb=120V